X-Git-Url: https://scripts.mit.edu/gitweb/autoinstallsdev/mediawiki.git/blobdiff_plain/74c929b24b048c9f1e31e17db757ae4195cd7673..HEAD:/maintenance/storage/blobs.sql

diff --git a/maintenance/storage/blobs.sql b/maintenance/storage/blobs.sql
index 0b1b82d8..979e68a9 100644
--- a/maintenance/storage/blobs.sql
+++ b/maintenance/storage/blobs.sql
@@ -4,5 +4,4 @@ CREATE TABLE /*$wgDBprefix*/blobs (
 	blob_id integer UNSIGNED NOT NULL AUTO_INCREMENT,
 	blob_text longblob,
 	PRIMARY KEY  (blob_id)
-) ENGINE=MyISAM MAX_ROWS=1000000 AVG_ROW_LENGTH=1000000;
-
+) ENGINE=InnoDB;
