X-Git-Url: https://scripts.mit.edu/gitweb/autoinstallsdev/mediawiki.git/blobdiff_plain/19e297c21b10b1b8a3acad5e73fc71dcb35db44a..6932310fd58ebef145fa01eb76edf7150284d8ea:/maintenance/mssql/archives/patch-oi_major_mime-chemical.sql

diff --git a/maintenance/mssql/archives/patch-oi_major_mime-chemical.sql b/maintenance/mssql/archives/patch-oi_major_mime-chemical.sql
new file mode 100644
index 00000000..35482edc
--- /dev/null
+++ b/maintenance/mssql/archives/patch-oi_major_mime-chemical.sql
@@ -0,0 +1,4 @@
+ALTER TABLE /*_*/oldimage
+DROP CONSTRAINT oi_major_mime_ckc;
+ALTER TABLE /*_*/oldimage
+WITH NOCHECK ADD CONSTRAINT oi_major_mime_ckc CHECK (oi_major_mime IN('unknown', 'application', 'audio', 'image', 'text', 'video', 'message', 'model', 'multipart', 'chemical'));
\ No newline at end of file
