X-Git-Url: https://scripts.mit.edu/gitweb/autoinstallsdev/mediawiki.git/blobdiff_plain/19e297c21b10b1b8a3acad5e73fc71dcb35db44a..6932310fd58ebef145fa01eb76edf7150284d8ea:/maintenance/archives/patch-page_no_title_convert.sql

diff --git a/maintenance/archives/patch-page_no_title_convert.sql b/maintenance/archives/patch-page_no_title_convert.sql
deleted file mode 100644
index e69de29b..00000000
