X-Git-Url: https://scripts.mit.edu/gitweb/autoinstallsdev/mediawiki.git/blobdiff_plain/19e297c21b10b1b8a3acad5e73fc71dcb35db44a..6932310fd58ebef145fa01eb76edf7150284d8ea:/maintenance/archives/patch-categorylinksindex.sql

diff --git a/maintenance/archives/patch-categorylinksindex.sql b/maintenance/archives/patch-categorylinksindex.sql
index 8a9ff123..e2b2c3ac 100644
--- a/maintenance/archives/patch-categorylinksindex.sql
+++ b/maintenance/archives/patch-categorylinksindex.sql
@@ -1,10 +1,10 @@
--- 
+--
 -- patch-categorylinksindex.sql
--- 
--- Per bug 10280 / http://bugzilla.wikimedia.org/show_bug.cgi?id=10280
+--
+-- Per task T12280 / https://phabricator.wikimedia.org/T12280
 --
 -- Improve enum continuation performance of the what pages belong to a category query
--- 
+--
 
 ALTER TABLE /*$wgDBprefix*/categorylinks
    DROP INDEX cl_sortkey,
