X-Git-Url: https://scripts.mit.edu/gitweb/autoinstallsdev/mediawiki.git/blobdiff_plain/19e297c21b10b1b8a3acad5e73fc71dcb35db44a..6932310fd58ebef145fa01eb76edf7150284d8ea:/maintenance/archives/patch-archive_ar_revid.sql

diff --git a/maintenance/archives/patch-archive_ar_revid.sql b/maintenance/archives/patch-archive_ar_revid.sql
index 67ee97b1..f3b9c3c9 100644
--- a/maintenance/archives/patch-archive_ar_revid.sql
+++ b/maintenance/archives/patch-archive_ar_revid.sql
@@ -1,4 +1,3 @@
 -- Hopefully temporary index.
--- For https://bugzilla.wikimedia.org/show_bug.cgi?id=21279
-ALTER TABLE /*$wgDBprefix*/archive
-	ADD INDEX ar_revid ( ar_rev_id );
\ No newline at end of file
+-- For https://phabricator.wikimedia.org/T23279
+CREATE INDEX /*i*/ar_revid ON /*$wgDBprefix*/archive ( ar_rev_id );
\ No newline at end of file
